What is Structural Heart Disease?

What is structural heart disease? Structural heart disease is a type of heart disease that is the result of wear and tear on the heart valves, or a type of heart disease a person is born with. A tight or leaky heart valve is structural heart disease. If a person is born with a hole within the chambers of the heart, this is a structural heart disease from birth.

Right now, structural heart disease is one of the fastest growing fields in cardiology. Patients can now receive minimally-invasive surgeries and treatments that are a lot less risky than open-heart surgery. These new surgeries have less trauma and a faster recovery time for the patients.

Surgeons who deal with structural heart diseases have a specialist expertise level. A heart surgeon usually works with a cardiologist and an image specialist to determine the best course of action for the patient. Depending on the patient’s symptoms, age, and personal history, the doctors will determine if open-heart surgery or minimally-invasive surgery is the better option that will lead to the best result.

Structural heart procedures and surgeries include:

Transcatheter Aortic Valve Replacement (TAVR)

Transcatheter Mitral Valve Repair (TMVR)

Paravalvular Leak Repair

Transcatheter mitral valve replacement

Balloon valvuloplasty for mitral stenosis

Repair of coarctation of the aorta

Repair of aneurysms

Repair of fistulas

Transcatheter pulmonary valve replacement

Looking for an Tampa Heart Valve Surgeon?

If you have structural heart valve disease, it’s time to talk to a heart valve surgeon. Dr. Peter Mikhail is a heart valve surgeon who specializes in mini-AVR and TAVR. He will be able to determine if you can have a minimally-invasive heart valve surgery or procedure. To book a consult, click our heart valve surgery page or call 727-312-4844. Dr. Mikhail is based in New Port Richey, Florida, and treats patients in the Tampa and Clearwater area.

The post What is Structural Heart Disease? appeared first on Dr. Peter Mikhail.